20 30 40 50^210^210×2^310 (GeV)

Pb,n γW 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

PbS

5−10

4−10

3−10

2−10 x Bjorken-

= 5.02 TeV NNs Pb −Pb ALICE,

(PLB 726 (2013) 290-295)

= 2.76 TeV NNs Pb − using ALICE Pb

Guzey et al.,

(PRC 96 (2017) 015203)

= 2.76 TeV NNs Pb − using ALICE Pb

Contreras, Impulse approximation STARlight EPS09 LO LTA GG-HS b-BK-A

ALI-PUB-567151

ALI-PUB-567151